010 2030 4050 6070

dN_{ch}/dη_{lab}

-5-4-3-2-1012345

η_{lab}

ALICE

Data

Uncorr. syst. unc.

p–Pb √ s_{NN} = 5.02 TeV

V0A and V0C

0 – 5 %

5 – 10 %

10 – 20 %

30 – 40 %

40 – 60 %

60 – 80 %

80 – 100 %

ALI-PUB-561284